import Compatibility from "../_compatibility.mdx";
import Usage from "../_usage.mdx";

# Scale

## Usage

<Usage />

## Compatibility

<Compatibility
  supported={[
    "scale-{n}",
    "scale-[n]",
    "scale-x-{n}",
    "scale-x-[n]",
    "scale-y-{n}",
    "scale-y-[n]",
  ]}
/>
